Nphoton

0 5 10 15 20

pairs γ Mass

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 mpi0_ng

Entries 19998 Mean x 9.245 Mean y 0.08393 RMS x 3.602 RMS y 0.08314 0 342 1 0 19005 650 0 0 0

1

10

210 ng_pip_pim

Entries 308

Mean 5.383

RMS 2.521

Underflow 0

=2^-π

=2, N +π Nphotons, N

0 5 10 15 20 0

10

20

30

40

50

ngammas

Entries 1000

Mean 5.978

RMS 3.009

Underflow 0

Nphotons

0 5 10 15 20 0 20 40 60 80 100 120 140 160 mass_pi0

Entries 20536 Mean 0.08461 RMS 0.0821 Underflow 0 / ndf

2χ 274.2 / 144 Prob 3.734e-10 p0 6.95±

24.12 p1 0.00598 ± 0.05411 p2 0.00509 ± -0.01368 p3 15.7±

124.4 p4 213.9±

-476.1 p5 705.3±

-429.1

(GeV) 0π Mass of

0 0.1 0.2 0.3 0.4 0.5 0

50

100

150

200

250

± ±

=826.9 0π No pairs) γ (All