Nphoton

0 5 10 15 20

pairs γ Mass

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 mpi0_ng

Entries 5118 Mean x 4.398 Mean y 0.1604 RMS x 1.194 RMS y 0.1003 0 105 0 0 5013 0 0 0 0

-1 10

1

10 ng_pip_pim

Entries 405

Mean 3.56

RMS 1.035

Underflow 0

=2^-π

=2, N +π Nphotons, N

0 5 10 15 20 0 20 40 60 80 100 120 140 160

ngammas

Entries 1000

Mean 3.521

RMS 1.166

Underflow 0

Nphotons

0 5 10 15 20 0 50 100 150 200 250 300 350 mass_pi0

Entries 5683 Mean 0.1577 RMS 0.09594 Underflow 0 / ndf

2χ 202.2 / 144 Prob 0.0009959 p0 2.16± 32.97 p1 0.001±

0.135 p2 0.000817 ± -0.009712 p3 3.895± 5.831 p4 73.5± 220.7 p5 289.2± -951.9

(GeV) 0π Mass of

0 0.1 0.2 0.3 0.4 0.5 0 10 20 30 40 50 60

±

=802.6 0π No pairs) γ (All