pip1delta

Entries 354 Mean 0.01485 RMS 0.2379 Underflow 9 / ndf

2χ 33.89 / 58 Prob 0.9952 p0 6.96±

69.07 p1 0.00183 ± 0.00073 p2 0.00186 ± 0.02401 p3 0.254±

1.915 p4 0.3053 ± 0.1323 p5 0.642±

-1.344

/p1 Δ -1 -0.5 0 0.5 1 0

20

40

60

80

± ±

±

=207.8 +π No pim1delta_{Entries 361}

Mean 0.01466 RMS 0.1858 Underflow 6 / ndf

2χ 43.77 / 48 Prob 0.6467 p0 6.87± 67.01 p1 0.001861 ± 0.001732 p2 0.00209 ± 0.02538 p3 0.286±

2.142 p4 0.3895 ± 0.0669 p5 0.938± -2.271

/p1 Δ -1 -0.5 0 0.5 1 0

50

100 pim1delta

Entries 361

± ±

±

=213.2 -π No

p1delta

Entries 800 Mean 0.04624 RMS 0.2485 Underflow 44 / ndf

2χ 123.6 / 74 Prob 0.0002657 p0 5.01±

58.76 p1 0.00315 ± 0.01346 p2 0.00417 ± -0.05277 p3 0.374±

4.144 p4 0.3114 ± 0.4043 p5 0.825±

-4.849

/p1 Δ -1 -0.5 0 0.5 1 0

20

40

60

80

± ±

±

No p=388.6

Gen p p1 (GeV)

0 1 2 3 4

/p1 Δ

-1

-0.5

0

0.5

1 p1diff

Entries 800 Mean x 0.5587 Mean y 0.04624 RMS x 0.1915 RMS y 0.2485 0 2 0 0 754 0 0 44 0