pip1delta

Entries 417 Mean 0.01972 RMS 0.1821 Underflow 2 / ndf

2χ 35.15 / 48 Prob 0.9165 p0 8.9± 104.6 p1 0.001366 ± 0.002841 p2 0.00142 ± 0.02214 p3 0.278±

1.944 p4 0.34066 ± 0.08298 p5 0.79± -1.73

/p1 Δ -1 -0.5 0 0.5 1 0

50

100

± ±

±

=290.4 +π No pim1delta_{Entries 436}

Mean 0.01453 RMS 0.168 Underflow 5 / ndf

2χ 47.14 / 50 Prob 0.5887 p0 6.9± 85.5 p1 0.001681 ± 0.002412 p2 0.00153 ± 0.02679 p3 0.282± 2.091 p4 0.4179914 ± -0.0006402 p5 0.998± -2.346

/p1 Δ -1 -0.5 0 0.5 1 0

20

40

60

80 pim1delta

Entries 436

± ±

±

=287.1 -π No

p1delta

Entries 771 Mean 0.0322 RMS 0.2195 Underflow 36 / ndf

2χ 119.8 / 66 Prob 5.802e-05 p0 5.79±

63.45 p1 0.00297 ± 0.01161 p2 0.00446 ± -0.05128 p3 0.398±

3.793 p4 0.3585 ± 0.1849 p5 1.013±

-4.689

/p1 Δ -1 -0.5 0 0.5 1 0

20

40

60

80

± ±

±

No p=407.8

Gen p p1 (GeV)

0 1 2 3 4

/p1 Δ

-1

-0.5

0

0.5

1 p1diff

Entries 771 Mean x 0.5703 Mean y 0.0322 RMS x 0.1896 RMS y 0.2195 0 1 0 0 734 0 0 36 0