p1 (GeV) +π Gen

0 1 2 3 4

p1 (GeV) +π Recons

0

1

2

3

4 pip_p1

Entries 198 Mean x 0.9756 Mean y 0.9616 RMS x 0.6367 RMS y 0.6759 0 0 0 0 198 0 0 0 0

p1 (GeV) +π Gen

0 1 2 3 4

/p1 Δ

-1

-0.5

0

0.5

1 pip1diff

Entries 198 Mean x 1.034 Mean y 0.05531 RMS x 0.6262 RMS y 0.3003 0 0 0 0 181 0 0 17 0

p1 (GeV) +π Gen

-1 -0.5 0 0.5 1

/p1 Δ

0

5

10

15 pip1delta

Entries 198 Mean 0.05531 RMS 0.3003 Underflow 17 / ndf

2χ 31.41 / 55 Prob 0.9956 p0 3.23± 15.01 p1 0.004908 ± 0.004739 p2 0.00609 ± 0.03036 p3 0.269± 1.724 p4 0.34091 ± 0.04326 p5 0.825± -1.132

/p1 Δ -1 -0.5 0 0.5 1

/p2 Δ

-1

-0.5

0

0.5

1 pipdeltas

Entries 198 Mean x 0.0546 Mean y 0.1393 RMS x 0.3017 RMS y 0.398 0 0 0 14 178 0 3 3 0