p2 (GeV) +π Gen

0 1 2 3 4

p2 (GeV) +π Recons

0

1

2

3

4 pip_p2

Entries 198 Mean x 2.076 Mean y 1.796 RMS x 0.8144 RMS y 0.9576 0 5 7 0 181 5 0 0 0

p2 (GeV) +π Gen

0 1 2 3 4

/p2 Δ

-1

-0.5

0

0.5

1 pip2diff

Entries 198 Mean x 2.098 Mean y 0.1042 RMS x 0.8032 RMS y 0.3879 0 0 0 0 181 11 0 5 1

p2 (GeV) +π Gen

-1 -0.5 0 0.5 1

/p2 Δ

0

10

20

30 pip2delta

Entries 198 Mean 0.1192 RMS 0.3955 Underflow 6 / ndf

2χ 18.56 / 54 Prob 1 p0 4.01± 25.19 p1 0.003501 ± 0.003443 p2 0.0036 ± 0.0277 p3 0.249± 1.271 p4 0.2883 ± 0.4874 p5 0.5715 ± 0.3741

/pΔ -1 -0.5 0 0.5 1

/p1 Δ

-1

-0.5

0

0.5

1 pp1deltas

Entries 198 Mean x 0.02171 Mean y -0.06222 RMS x 0.03462 RMS y 0.2599 0 0 0 0 29 152 0 2 15