p1 (GeV) -π Gen

0 1 2 3 4

p1 (GeV) -π Recons

0

1

2

3

4 pim_p1

Entries 198 Mean x 1.207 Mean y 1.2 RMS x 0.6643 RMS y 0.7541 0 2 0 0 196 0 0 0 0

p1 (GeV) -π Gen

0 1 2 3 4

/p1 Δ

-1

-0.5

0

0.5

1 pim1diff

Entries 198 Mean x 1.235 Mean y 0.03243 RMS x 0.654 RMS y 0.2695 0 0 0 0 189 0 0 9 0

p1 (GeV) -π Gen

-1 -0.5 0 0.5 1

/p1 Δ

0

10

20

30 pim1delta

Entries 198 Mean 0.03243 RMS 0.2695 Underflow 9 / ndf

2χ 26.93 / 51 Prob 0.9978 p0 3.34± 21.59 p1 0.003830 ± 0.003453 p2 0.00334 ± 0.02826 p3 0.249± 1.655 p4 0.3824309 ± 0.0004396 p5 0.8309± -0.9388

/p1 Δ -1 -0.5 0 0.5 1

/p2 Δ

-1

-0.5

0

0.5

1 pimdeltas

Entries 198 Mean x 0.03246 Mean y 0.1419 RMS x 0.2737 RMS y 0.3649 0 1 0 8 180 0 1 8 0