Gen p p1 (GeV)

0 1 2 3 4

Recons p p1 (GeV)

0

1

2

3

4 p_p1

Entries 31 Mean x 0.5947 Mean y 0.5865 RMS x 0.1897 RMS y 0.1958 0 0 0 0 31 0 0 0 0

Gen p p1 (GeV)

0 1 2 3 4

/p1 Δ

-1

-0.5

0

0.5

1 p1diff

Entries 31 Mean x 0.5947 Mean y 0.01747 RMS x 0.1897 RMS y 0.03812 0 0 0 0 31 0 0 0 0

Gen p p1 (GeV)

-1 -0.5 0 0.5 1

/p1 Δ

0

2

4

6

8 p1delta

Entries 31 Mean 0.01747 RMS 0.03812 Underflow 0 / ndf

2χ 1.757 / 4 Prob 0.7803 p0 2.124± 6.027 p1 0.00987 ± 0.01552 p2 0.01100 ± 0.02486 p3 0.88± 1.45