omega_c1

Entries 1232 Mean 0.9683 RMS 0.2626 Underflow 0 / ndf

2χ 55.44 / 54 Prob 0.4203 p0 2.08±

17.24 p1 0.0064 ± 0.7777 p2 0.0065 ± 0.0423 p3 14.02±

-43.14 p4 33.2± 121 p5 18.8±

-64.6

4combs ω 0 0.5 1 1.5 2 0

10

20

30 ± ±

s=182.8 ω No s)γ (Measured

omega_c2

Entries 408 Mean 0.9701 RMS 0.2429 Underflow 0 / ndf

2χ 49.19 / 52 Prob 0.5849 p0 1.809±

9.725 p1 0.0057 ± 0.7716 p2 0.00529 ± 0.02945 p3 6.97±

-23.46 p4 16.34±

58.37 p5 9.15±

-30.68

p cuts Δ 4combs, ω 0 0.5 1 1.5 2 0

5

10 ± ±

s=71.8 ω No p/p cut<0.2) Δ(

omega_c3

Entries 1232 Mean 0.9969 RMS 0.2557 Underflow 0 / ndf

2χ 110.2 / 92 Prob 0.09449 p0 6.80±

62.19 p1 0.0012 ± 0.7839 p2 0.00133 ± 0.01348 p3 2.88±

-35.72 p4 6.70±

93.58 p5 3.43±

-45.66

gen 0π 4combs, ω 0 0.5 1 1.5 2 0

20

40

60 ± ±

=210.1 ω No (Fraction=0.21)

omega_c4

Entries 408 Mean 0.9931 RMS 0.2374 Underflow 0 / ndf

2χ 70.4 / 77 Prob 0.6892 p0 3.99±

25.13 p1 0.0018 ± 0.7817 p2 0.00191 ± 0.01421 p3 2.47±

-10.56 p4 5.10±

27.41 p5 2.46±

-13.19

p cuts Δ gen, 0π 4combs, ω 0 0.5 1 1.5 2 0

10

20

30

± ±

s=89.5 ω No p/p cut<0.2)

Δ,^0π

(Gen