omega_c1

Entries 1620 Mean 0.9975 RMS 0.282 Underflow 0 / ndf

2χ 48.08 / 54 Prob 0.701 p0 3.00±

23.95 p1 0.0042 ± 0.7816 p2 0.00393 ± 0.03226 p3 15.21±

-57.12 p4 36.0±

154.2 p5 20.31±

-79.53

4combs ω 0 0.5 1 1.5 2 0

10

20

30

40

± ±

s=193.7 ω No s)γ (Measured

omega_c2

Entries 592 Mean 1.004 RMS 0.2577 Underflow 0 / ndf

2χ 47.61 / 54 Prob 0.7176 p0 2.81±

12.62 p1 0.0038 ± 0.7922 p2 0.00303 ± 0.01576 p3 8.30±

-36.05 p4 19.81±

88.82 p5 11.26±

-45.67

p cuts Δ 4combs, ω 0 0.5 1 1.5 2 0

5

10

15 ± ±

s=49.9 ω No p/p cut<0.2) Δ(

omega_c3

Entries 1620 Mean 1.016 RMS 0.2635 Underflow 0 / ndf

2χ 110.1 / 91 Prob 0.08425 p0 6.80±

71.62 p1 0.0012 ± 0.7809 p2 0.0015 ± 0.0166 p3 3.09±

-52.15 p4 7.2±

133.6 p5 3.65±

-65.07

gen 0π 4combs, ω 0 0.5 1 1.5 2 0

20

40

60

80

± ±

=298.1 ω No (Fraction=0.30)

omega_c4

Entries 592 Mean 1.003 RMS 0.241 Underflow 0 / ndf

2χ 77.55 / 86 Prob 0.7309 p0 5.07±

38.83 p1 0.001±

0.782 p2 0.00156 ± 0.01391 p3 2.40±

-17.93 p4 5.19±

44.69 p5 2.55±

-21.35

p cuts Δ gen, 0π 4combs, ω 0 0.5 1 1.5 2 0

10

20

30

40

±

s=135.4 ω No p/p cut<0.2)

Δ,^0π

(Gen