Nphoton

0 5 10 15 20

pairs γ Mass

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 mpi0_ng

Entries 2887 Mean x 5.243 Mean y 0.1159 RMS x 2.718 RMS y 0.08615 0 76 0 0 2811 0 0 0 0

-1 10

1

10 ng_pip_pim

Entries 517

Mean 2.478

RMS 1.073

Underflow 0

=1^-π

=1, N +π Nphotons, N

0 5 10 15 20 0 50 100 150 200 250 300 350

ngammas

Entries 1000

Mean 2.44

RMS 1.503

Underflow 0

Nphotons

0 5 10 15 20 0

100

200

300

400

500 mass_pi0

Entries 2887 Mean 0.1159 RMS 0.08615 Underflow 0 / ndf

2χ 159.5 / 144 Prob 0.1781 p0 1.94± 27.05 p1 0.0005 ± 0.1343 p2 0.000508 ± 0.007226 p3 2.60± 20.92 p4 44.2± -138 p5 166.6± 233.6

(GeV) 0π Mass of

0 0.1 0.2 0.3 0.4 0.5 0 5 10 15 20 25 30 35 40 45

± ±

=490.0 0π No pairs) γ (All