Nphoton

0 5 10 15 20

pairs γ Mass

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 mpi0_ng

Entries 896 Mean x 2.297 Mean y 0.1221 RMS x 0.5601 RMS y 0.04416 0 20 0 0 876 0 0 0 0

1

10

210 ng_pip_pim

Entries 535

Mean 2.062

RMS 0.2482

Underflow 0

=1^-π

=1, N +π Nphotons, N

0 5 10 15 20 0

100

200

300

400

500

ngammas

Entries 1000

Mean 1.793

RMS 0.6084

Underflow 0

Nphotons

0 5 10 15 20 0 100 200 300 400 500 600 mass_pi0

Entries 896 Mean 0.1221 RMS 0.04416 Underflow 0 / ndf

2χ 102 / 121 Prob 0.8937 p0 1.75±

26.68 p1 0.0004 ± 0.1339 p2 0.00041 ± 0.00718 p3 1.299±

1.733 p4 23.524 ± 3.742 p5 92.7±

-35.5

(GeV) 0π Mass of

0 0.1 0.2 0.3 0.4 0.5 0 5 10 15 20 25 30 35 40 45

± ±

±

=480.2 0π No pairs) γ (All