pip1delta

Entries 542 Mean 0.0283 RMS 0.1719 Underflow 5 / ndf

2χ 35.44 / 48 Prob 0.9106 p0 3.75±

56.52 p1 0.003±

0.012 p2 0.00310 ± 0.05887 p3 0.349±

1.832 p4 0.4695 ± 0.2988 p5 1.056±

-1.606

/p1 Δ -1 -0.5 0 0.5 1 0

20

40

60

±

±

=417.0 +π No pim1delta_{Entries 540}

Mean 0.03197 RMS 0.2106 Underflow 4 / ndf

2χ 29.51 / 56 Prob 0.9986 p0 3.53± 50.47 p1 0.003491 ± 0.009304 p2 0.00366 ± 0.06564 p3 0.295±

1.619 p4 0.3046 ± 0.1397 p5 0.6252 ± -0.6778

/p1 Δ -1 -0.5 0 0.5 1 0

20

40 pim1delta

Entries 540

± ±

± ±

=415.2 -π No

p1delta

Entries 580 Mean 0.007805 RMS 0.1075 Underflow 14 / ndf

2χ 17.77 / 32 Prob 0.9801 p0 4.66±

79.36 p1 0.00240 ± 0.01553 p2 0.0021 ± 0.0504 p3 0.336±

1.332 p4 0.546±

-0.188 p5 1.1959 ± -0.8557

/p1 Δ -1 -0.5 0 0.5 1 0

20

40

60

80

± ±

±

No p=501.3

Gen p p1 (GeV)

0 2 4 6

/p1 Δ

-1

-0.5

0

0.5

1 p1diff

Entries 580 Mean x 0.4968 Mean y 0.007805 RMS x 0.1835 RMS y 0.1075 0 0 0 0 566 0 0 14 0