pip1delta

Entries 437 Mean 0.07461 RMS 0.259 Underflow 3 / ndf

2χ 47.87 / 46 Prob 0.3967 p0 9.0± 105.2 p1 0.001446 ± 0.000763 p2 0.00157 ± 0.02371 p3 0.26± 1.29 p4 0.436± 0.241 p5 0.7901 ± 0.2353

/p1 Δ -1 -0.5 0 0.5 1 0

50

100

± ±

±

=312.7 +π No pim1delta_{Entries 446}

Mean 0.05498 RMS 0.2179 Underflow 5 / ndf

2χ 44.6 / 50 Prob 0.689 p0 7.52± 91.55 p1 1.615e-03 ± -1.421e-06 p2 0.00167 ± 0.02697 p3 0.272± 1.641 p4 0.4154 ± 0.2774 p5 0.7846 ± -0.7044

/p1 Δ -1 -0.5 0 0.5 1 0

50

100 pim1delta

Entries 446

± ±

± ±

=309.4 -π No

p1delta

Entries 583 Mean 0.009654 RMS 0.1587 Underflow 24 / ndf

2χ 35.01 / 53 Prob 0.9732 p0 7.1± 107.2 p1 0.0016 ± 0.0189 p2 0.00156 ± 0.03248 p3 0.250± 1.681 p4 0.386252 ± -0.004863 p5 0.777± -1.179

/p1 Δ -1 -0.5 0 0.5 1 0

50

100

± ±

±

No p=436.5

Gen p p1 (GeV)

0 2 4 6

/p1 Δ

-1

-0.5

0

0.5

1 p1diff

Entries 583 Mean x 0.5061 Mean y 0.009654 RMS x 0.1914 RMS y 0.1587 0 1 0 0 558 0 0 24 0