pip1delta

Entries 430 Mean 0.04419 RMS 0.1897 Underflow 2 / ndf

2χ 15.26 / 34 Prob 0.9977 p0 7.3± 106.9 p1 0.001471 ± 0.000549 p2 0.00127 ± 0.02683 p3 0.311± 1.387 p4 0.9556 ± 0.1213 p5 1.3654 ± -0.3291

/p1 Δ -1 -0.5 0 0.5 1 0

50

100

± ±

± ±

=359.3 +π No pim1delta_{Entries 433}

Mean 0.02562 RMS 0.171 Underflow 3 / ndf

2χ 29.81 / 31 Prob 0.527 p0 7.89±

92.11 p1 0.00168 ± 0.00114 p2 0.00212 ± 0.02992 p3 0.350±

1.698 p4 0.47645 ± -0.02768 p5 0.7855 ± -0.8293

/p1 Δ -1 -0.5 0 0.5 1 0

50

100 pim1delta

Entries 433

± ±

± ±

=345.4 -π No

p1delta

Entries 516 Mean 0.009888 RMS 0.1118 Underflow 15 / ndf

2χ 25.74 / 36 Prob 0.8975 p0 5.87±

92.19 p1 0.00186 ± 0.01926 p2 0.00160 ± 0.03548 p3 0.340±

1.817 p4 0.6213 ± -0.3863 p5 1.813±

-2.648

/p1 Δ -1 -0.5 0 0.5 1 0

50

100

± ±

±

No p=410.0

Gen p p1 (GeV)

0 2 4 6

/p1 Δ

-1

-0.5

0

0.5

1 p1diff

Entries 516 Mean x 0.4988 Mean y 0.009888 RMS x 0.1764 RMS y 0.1118 0 0 0 0 501 0 0 15 0