omega_c1

Entries 696 Mean 0.7778 RMS 0.0946 Underflow 0 / ndf

2χ 46.01 / 50 Prob 0.6342 p0 3.8± 66.3 p1 0.0015 ± 0.7766 p2 0.00132 ± 0.03202 p3 1.431±

1.996 p4 2.8326 ± -0.4853 p5 1.2940 ± -0.0944

1combs ω 0 0.5 1 1.5 2 0

20

40

60

80

± ±

± ±

s=532.1 ω No s)γ (Measured

omega_c2

Entries 396 Mean 0.7721 RMS 0.04898 Underflow 0 / ndf

2χ 11.35 / 22 Prob 0.9693 p0 3.39±

49.33 p1 0.0017 ± 0.7757 p2 0.00149 ± 0.02821 p3 10.101 ± 1.871 p4 28.149 ± -1.165 p5 18.75367 ± 0.05108

p cuts Δ 1combs, ω 0 0.5 1 1.5 2 0

20

40

60

± ± ± ± ±

s=348.7 ω No p/p cut<0.2) Δ(

omega_c3

Entries 696 Mean 0.7864 RMS 0.08428 Underflow 0 / ndf

2χ 40.44 / 45 Prob 0.6653 p0 5.26±

80.95 p1 0.0012 ± 0.7794 p2 0.00141 ± 0.02674 p3 3.054±

-2.676 p4 7.36±

10.78 p5 4.186±

-6.493

gen 0π 1combs, ω 0 0.5 1 1.5 2 0

50

100

± ±

=542.6 ω No (Fraction=0.54)

omega_c4

Entries 396 Mean 0.7794 RMS 0.02256 Underflow 0 / ndf

2χ 10.34 / 9 Prob 0.3234 p0 5.17±

67.59 p1 0.0013 ± 0.7801 p2 0.00127 ± 0.01922 p3 5.0±

-490.8 p4 9.8±

1273 p5 8.6±

-817.2

p cuts Δ gen, 0π 1combs, ω 0 0.5 1 1.5 2 0

20

40

60

80

± ±

s=325.6 ω No p/p cut<0.2)

Δ, ^0π

(Gen