omega_c1

Entries 517 Mean 0.7853 RMS 0.135 Underflow 0 / ndf

2χ 28.2 / 49 Prob 0.9925 p0 3.94±

58.19 p1 0.00± 0.78 p2 0.00130 ± 0.02673 p3 1.428±

2.386 p4 2.706±

-1.323 p5 1.1409 ± 0.2859

1combs ω 0 0.5 1 1.5 2 0

20

40

60

±

±

s=389.9 ω No s)γ (Measured

omega_c2

Entries 304 Mean 0.7767 RMS 0.08647 Underflow 0 / ndf

2χ 16.47 / 32 Prob 0.9894 p0 3.49±

40.52 p1 0.0017 ± 0.7805 p2 0.00143 ± 0.02308 p3 1.918±

2.038 p4 3.723±

-1.036 p5 1.5924 ± 0.2328

p cuts Δ 1combs, ω 0 0.5 1 1.5 2 0

10

20

30

40

± ±

±

s=234.4 ω No p/p cut<0.2) Δ(

omega_c3

Entries 517 Mean 0.7969 RMS 0.1273 Underflow 0 / ndf

2χ 31.07 / 34 Prob 0.6118 p0 6.70±

93.64 p1 0.0009 ± 0.7823 p2 0.00094 ± 0.01742 p3 2.654±

1.549 p4 5.7190 ± 0.5088 p5 2.9376 ± -0.7376

gen 0π 1combs, ω 0 0.5 1 1.5 2 0

50

100

± ±

± ±

=408.9 ω No (Fraction=0.41)

omega_c4

Entries 304 Mean 0.7839 RMS 0.022 Underflow 0 / ndf

2χ 6.009 / 11 Prob 0.8728 p0 5.88±

68.93 p1 0.001±

0.783 p2 0.00105 ± 0.01522 p3 76.94±

-35.71 p4 191.5±

100.6 p5 118.36 ± -66.44

p cuts Δ gen, 0π 1combs, ω 0 0.5 1 1.5 2 0

20

40

60

±

±

s=263.0 ω No p/p cut<0.2)

Δ, ^0π

(Gen