omega_c1

Entries 535 Mean 0.7783 RMS 0.07149 Underflow 0 / ndf

2χ 33.04 / 36 Prob 0.6103 p0 5.51±

85.05 p1 0.0010 ± 0.7806 p2 0.00094 ± 0.02002 p3 3.0493 ± -0.7393 p4 7.039±

6.183 p5 3.801±

-3.814

1combs ω 0 0.5 1 1.5 2 0

20

40

60

80

± ± ±

s=426.8 ω No s)γ (Measured

omega_c2

Entries 347 Mean 0.776 RMS 0.0427 Underflow 0 / ndf

2χ 10.47 / 21 Prob 0.9721 p0 4.4± 58 p1 0.0013 ± 0.7812 p2 0.00114 ± 0.02032 p3 9.758±

-4.534 p4 25.10±

15.84 p5 15.68±

-10.22

p cuts Δ 1combs, ω 0 0.5 1 1.5 2 0

20

40

60

± ±

s=295.5 ω No p/p cut<0.2) Δ(

omega_c3

Entries 535 Mean 0.7863 RMS 0.06033 Underflow 0 / ndf

2χ 26.57 / 29 Prob 0.5949 p0 8.2±

124.1 p1 0.0007 ± 0.7811 p2 0.00070 ± 0.01458 p3 3.5797 ± -0.6423 p4 7.784±

4.917 p5 3.997±

-2.774

gen 0π 1combs, ω 0 0.5 1 1.5 2 0

50

100 ± ± ±

=453.4 ω No (Fraction=0.45)

omega_c4

Entries 347 Mean 0.7833 RMS 0.01659 Underflow 0 / ndf

2χ 10.15 / 5 Prob 0.07099 p0 7.60±

82.35 p1 0.0010 ± 0.7814 p2 0.00099 ± 0.01117 p3 1118.8 ± -3283 p4 2857.1 ± 8408 p5 1817.4 ± -5359

p cuts Δ gen, 0π 1combs, ω 0 0.5 1 1.5 2 0

20

40

60

80

± ± ± ± ±

s=230.6 ω No p/p cut<0.2)

Δ, ^0π

(Gen