Solenoid Current (A)

500 1000 1500 width (MeV) ω Reconstructed

0 5 10 15 20 25 30 35 40_{ωσ}

p/p<0.2) Δ (_ωσ )^0π

(Gen ωσ p/p<0.2)

Δ, ^0π

(Gen ωσ