width (MeV) ω Reconstructed

0

10

20

30

40

50

60 HADR=DCAY=0 ω HADR=DCAY=1 ω HADR=DCAY=0 π_1b HADR=DCAY=1 π_1b

Full Full p/p<0.2 Δ 0π Gen ^0πGen p/p<0.2 Δ