z(cm)

-200 0 200 400 600

x(cm)

-200

-150

-100 -50 0 50 100 150 200

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

Btot<0.0160 T, y=0.0 cm Btot(T)