0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

1000

2000

3000

4000

5000

Chi2 of fit to true hits

Rmin=10.0 cm klayers=4 sigdy=0.020 cm rstraw=0.8 cm

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 1000

2000

3000

4000

5000

6000

7000

8000

Chi2 of fit to all combinations

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 200 400 600 800 1000

1200

Prob of fit to true hits

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 310

410

510

610

Prob of fit to all combinations