H1Rmg1g2

Entries 2963 Mean 0.5354 RMS 0.01921 Underflow 0 Overflow 0 Integral 2963

0 0.2 0.4 0.6 0.8 1 0 100 200 300 400 500 600

REC mg1g2 (GeV)^{H1Rmg1g22}

Entries 2963 Mean 0.287 RMS 0.02079 Underflow 0 Overflow 0 Integral 2963

0 0.2 0.4 0.6 0.8 1 0 100 200 300 400 500 600

H1Rmg1g22

)^2

(GeV 2 REC mg1g2

H1Reta_inelast1 Entries 3831 Mean 0.02912 RMS 1.076 Underflow 432 Overflow 1063 Integral 2336

-2 -1 0 1 2 0 10 20 30 40 50 60 70 80 90 100 (E1,E2) b REC Ratio(p1/eta1) - E^{H1Reta_inelast2}

Entries 3831 Mean -0.01102 RMS 1.062 Underflow 397 Overflow 1129 Integral 2305

-2 -1 0 1 2 0 10 20 30 40 50 60 70 80 90 100 H1Reta_inelast2 )θ (E1, b REC Ratio(p2/eta2) - E