Beam Energy (GeV)

6 8 10 12 0

2000

4000

6000

8000

10000

Eb=11.00 GeV H1Eb

Entries 10000 Mean 11 RMS 0 Underflow 0 Overflow 0 Integral 1e+04

Eb=11.00 GeV

0 0.01 0.02 0.03 0.04 0.05 0 200 400 600 800 1000

1200

1400

1600

1800

2000

)^2

-t (GeV H1t_{Entries 10000}

Mean 0.00218 RMS 0.001977 Underflow 0 Overflow 0 Integral 1e+04

-t (GeV

0 0.2 0.4 0.6 0.8 1 0

2000

4000

6000

8000

10000

mg1g2 (GeV) H1mg1g2

Entries 10000 Mean 0.5479 RMS 0.0001069 Underflow 0 Overflow 0 Integral 1e+04

mg1g2 (GeV)

0 0.2 0.4 0.6 0.8 1 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

)^2

(GeV 2 mg1g2^{H1mg1g22}_{Entries 10000}

Mean 0.3002 RMS 0.0001172 Underflow 0 Overflow 0 Integral 1e+04

2 mg1g2