H1eta_the

Entries 10000

Mean 0.2046

RMS 0.106

Underflow 0

Overflow 0

Integral 1e+04

0 1 2 3 0

200

400

600

800

1000

1200

(degrees) ηθ

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 H2Deta_thevsthe Entries 10000 Mean x 0.2042 Mean y -0.007686 RMS x 0.105 RMS y 0.04423 Integral 7279 0 2721 0 0 7279 0 0 0 0

0 10 20 30 40 50 60 (degrees) ηθ vs ηθ GEN-REC

0 0.5 1 1.5 2 2.5 3

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 H1eta_inelast_the Entries 10000 Mean x 0.2046 Mean y -0.01517 RMS x 0.106 RMS y 0.001144 Integral 1e+04 0 0 0 0 10000 0 0 0 0

0

200

400

600

800

1000

ηθ vs b - E ηpz H1eta_inelast1

Entries 10000

Mean -0.0002722

RMS 6.398e-05

Underflow 0

Overflow 0

Integral 1e+04

-0.2 -0.1 0 0.1 0.2 0

2000

4000

6000

8000

10000

H1eta_inelast1 b Ratio(p1/eta1) - E