H1REb

Entries 10000

Mean 11

RMS 0.01089

Underflow 0

Overflow 0

Integral 1e+04

Beam Energy (GeV)

6 8 10 12 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

REC Eb=11.00 GeV H1Rt

Entries 10000

Mean 0.005877

RMS 0.004622

Underflow 2721

Overflow 2461

Integral 4818

0 0.01 0.02 0.03 0.04 0.05 0 50 100 150 200 250 300 350 400 450 H1Rt )^2

REC -t (GeV

H1Rmg1g2

Entries 7167 Mean 0.5479 RMS 0.01483 Underflow 0 Overflow 0 Integral 7167 / ndf

2χ 68.55 / 6 Prob 8.092e-13 Constant 26.7±

1892 Mean 0.0002 ± 0.5482 Sigma 0.00012 ± 0.01501

0 0.2 0.4 0.6 0.8 1 0 200 400 600 800 1000

1200

1400

1600

1800

± ±

REC mg1g2 (GeV) H1Rmg1g22_{Entries 7167}

Mean 0.3004 RMS 0.01626 Underflow 0 Overflow 0 Integral 7167 / ndf

2χ 107.1 / 7 Prob 3.613e-20 Constant 24.5±

1740 Mean 0.0002 ± 0.3008 Sigma 0.00012 ± 0.01622

0 0.2 0.4 0.6 0.8 1 0 200 400 600 800 1000

1200

1400

1600

H1Rmg1g22

Entries 7167

± ±

)^2

(GeV 2 REC mg1g2