H1Reta_the

Entries 10000

Mean 0.2119

RMS 0.1098

Underflow 2721

Overflow 0

Integral 7279

0 1 2 3 0 100 200 300 400 500 600 700 800

k1=0.050 k2=0.000 k3=0.020

(degrees) ηθ REC ^{H1Reta_pinelast}_{Entries 10000}

Mean -0.01167 RMS 0.2372 Underflow 2719 Overflow 2 Integral 7279 / ndf

2χ 49.5 / 42 Prob 0.1989 Constant 7.1±

492.2 Mean 0.00277 ± -0.01302 Sigma 0.0019 ± 0.2344

-2 -1 0 1 2 0

100

200

300

400

500

H1Reta_pinelast

Entries 10000

± ±

q1=0.640 q2=0.000 q3=0.000

b - E η REC pz

0 0.5 1 1.5 2 2.5 3 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 H1Reta_inelast_the Entries 10000 Mean x 0.2119 Mean y -0.01167 RMS x 0.1098 RMS y 0.2372 Integral 7279 2 0 0 0 7279 0 2719 0 0

0 10 20 30 40 50 60

ηθ vs b - E ηpz

9 9.5 10 10.5 11 11.5 12 9

9.5

10

10.5

11

11.5

12 H2RetaEvsetaE2 Entries 10000 Mean x 11.01 Mean y 11 RMS x 0.1765 RMS y 0.2371 Integral 7279 0 0 0 0 7279 0 271 51 2399

0 5 10 15 20 25 30 35 40 ) GeV θ (E1, η (E1,E2) vs E η REC E