H1Dg1_the

Entries 10000 Mean -0.1499 RMS 0.36 Underflow 0 Overflow 0 Integral 1e+04 / ndf

2χ 243.7 / 33 Prob 5.607e-34 Constant 27.8±

1917 Mean 0.00038 ± 0.00026 Sigma 0.00032 ± 0.03433

-1 -0.5 0 0.5 1 0 200 400 600 800 1000

1200

1400

1600

1800

2000

± ±

k1=0.050 k2=0.000 k3=0.020

/E_{1γ}EΔ

GEN-REC ^{H1Dg2_the}_{Entries 10000}

Mean -0.1477 RMS 0.3574 Underflow 0 Overflow 0 Integral 1e+04 / ndf

2χ 229.6 / 37 Prob 1.23e-29 Constant 27.9± 1938 Mean 0.000376 ± 0.000415 Sigma 0.00032 ± 0.03414

-1 -0.5 0 0.5 1 0 200 400 600 800 1000

1200

1400

1600

1800

2000

H1Dg2_the

Entries 10000

± ±

q1=0.640 q2=0.000 q3=0.000

/E_{2γ}EΔ

GEN-REC

H1Deta_E

Entries 10000 Mean -0.003518 RMS 0.2371 Underflow 0 Overflow 2721 Integral 7279 / ndf

2χ 55.86 / 41 Prob 0.06078 Constant 7.0± 494.7 Mean 0.002760 ± -0.001658 Sigma 0.0019 ± 0.2331

-2 -1 0 1 2 0

100

200

300

400

500

± ±

(E1,E2) ηEΔ GEN-REC ^{H1Deta_E2}_{Entries 10000}

Mean -0.01262 RMS 0.2181 Underflow 2365 Overflow 271 Integral 7364 / ndf

2χ 114 / 64 Prob 0.0001212 Constant 9.3± 657.2 Mean 0.002069 ± -0.006122 Sigma 0.001±

0.176

-2 -1 0 1 2 0 100 200 300 400 500 600

H1Deta_E2

Entries 10000

±

)θ (E, ηEΔ GEN-REC