H1REg1

Entries 10000 Mean 4.069 RMS 3.025 Underflow 0 Overflow 0 Integral 1e+04

0 5 10 0 200 400 600 800 1000

1200

1400

1600

k1=0.050 k2=0.000 k3=0.020

(GeV) 1γ REC E H1REg2

Entries 10000 Mean 4.139 RMS 3.058 Underflow 0 Overflow 0 Integral 1e+04

0 5 10 0 200 400 600 800 1000

1200

1400

1600

H1REg2

q1=0.640 q2=0.000 q3=0.000

(GeV) 2γ REC E

0 5 10 0

2

4

6

8

10

12 H2REg1vsEg2 Entries 10000 Mean x 4.069 Mean y 4.139 RMS x 3.025 RMS y 3.058 Integral 1e+04 0 0 0 0 10000 0 0 0 0

0 50 100 150 200 250 300 350 400 GeV 2γ vs E 2γ REC E H1RPp

Entries 10000 Mean 0.0427 RMS 0.019 Underflow 0 Overflow 0 Integral 1e+04

0 0.1 0.2 0.3 0.4 0.5 0

200

400

600

800

1000

H1RPp

(GeV) p REC P