H1Rtheg1

Entries 10000 Mean 4.189 RMS 3.151 Underflow 1503 Overflow 168 Integral 8329

0 5 10 15 20 0 50 100 150 200 250 300 350 400 450

k1=0.050 k2=0.000 k3=0.020

(deg) 1γθ REC H1Rtheg2

Entries 10000 Mean 4.146 RMS 3.152 Underflow 1479 Overflow 191 Integral 8330

0 5 10 15 20 0

100

200

300

400

500 H1Rtheg2

q1=0.640 q2=0.000 q3=0.000

(deg) 2γθ REC

0 5 10 15 20 0 2 4 6 8 10 12 14 16 18 20 H2Rtheg1vstheg2 Entries 10000 Mean x 3.242 Mean y 3.193 RMS x 1.558 RMS y 1.552 Integral 7279 191 0 0 1051 7279 0 261 1050 168

0 20 40 60 80 100 120 140 160 180 200 (deg) 2γθ vs 2γθ REC ^{H1Dtheg1}_{Entries 10000}

Mean 0.2419 RMS 0.6247 Underflow 0 Overflow 127 Integral 9873 / ndf

2χ 2015 / 69 Prob 0 Constant 36.5± 2191 Mean 0.0008072 ± -0.0007929 Sigma 0.00088 ± 0.07155

-2 -1 0 1 2 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400

H1Dtheg1

Entries 10000

± ±

(deg) 1γθ GEN-REC