H1theg2g1

Entries 10000 Mean 7.637 RMS 2.711 Underflow 0 Overflow 397 Integral 9603

0 5 10 15 20 0 200 400 600 800 1000

1200

1400

1600

1800

k1=0.050 k2=0.000 k3=0.020

(deg)

2γ1γθ H1Rtheg2g1

Entries 10000 Mean 4.676 RMS 2.942 Underflow 0 Overflow 0 Integral 1e+04

0 5 10 15 20 0

500

1000

1500

2000

2500

H1Rtheg2g1

q1=0.640 q2=0.000 q3=0.000

(deg) 2γ1γθ REC

0 2 4 6 8 10 12 14 16 18 20 0 2 4 6 8 10 12 14 16 18 20 H2Rtheg1g2_theg1g2

Entries 10000 Mean x 7.637 Mean y 4.87 RMS x 2.711 RMS y 2.841 Integral 9603 0 0 0 0 9603 397 0 0 0

0

200

400

600

800

1000

(deg) 2γ1γθ vs 2γ1γθ REC H1Dtheg2g1_{Entries 10000}

Mean -0.0005398 RMS 0.1109 Underflow 0 Overflow 2721 Integral 7279 / ndf

2χ 357.4 / 12 Prob 0 Constant 17.4± 1282 Mean 0.001305 ± 0.001473 Sigma 0.0007 ± 0.1078

-2 -1 0 1 2 0 200 400 600 800 1000

1200

H1Dtheg2g1

Entries 10000

± ±

(deg) 2γ1γθ GEN-REC