H1Deta_the

Entries 10000 Mean -0.007686 RMS 0.04423 Underflow 0 Overflow 2721 Integral 7279 / ndf

2χ 167.3 / 16 Prob 2.946e-27 Constant 21.7± 1330 Mean 0.000513 ± -0.007083 Sigma 0.00048 ± 0.04266

-1 -0.5 0 0.5 1 0 200 400 600 800 1000

1200

1400

± ±

k1=0.050 k2=0.000 k3=0.020

(degrees) ηθ GEN-REC ^{H1Deta_the2}_{Entries 10000}

Mean -0.007688 RMS 0.04423 Underflow 0 Overflow 2721 Integral 7279 / ndf

2χ 166.7 / 16 Prob 3.884e-27 Constant 21.7± 1329 Mean 0.000513 ± -0.007129 Sigma 0.0005 ± 0.0427

-1 -0.5 0 0.5 1 0 200 400 600 800 1000

1200

1400

H1Deta_the2

Entries 10000

± ±

q1=0.640 q2=0.000 q3=0.000

EQ11 (degrees) ηθ GEN-REC

H1Reta_inelast1

Entries 7146 Mean 0.002817 RMS 0.24 Underflow 0 Overflow 0 Integral 7146 / ndf

2χ 37.3 / 42 Prob 0.6772 Constant 6.8± 476.5 Mean 0.002837 ± 0.001661 Sigma 0.0019 ± 0.2381

-2 -1 0 1 2 0 50 100 150 200 250 300 350 400 450

± ±

(E1,E2) b REC Ratio(p1/eta1) - E H1Reta_inelast2_{Entries 7146}

Mean 0.006697 RMS 0.1769 Underflow 0 Overflow 0 Integral 7146 / ndf

2χ 54.67 / 31 Prob 0.005438 Constant 9.2± 643.8 Mean 0.002092 ± 0.006529 Sigma 0.0014 ± 0.1758

-2 -1 0 1 2 0 100 200 300 400 500 600

H1Reta_inelast2

Entries 7146

± ±

)θ (E1, b REC Ratio(p2/eta2) - E