Shapes

Time (ns)

0 50 100

Amplitude (mV)

200

400

600

800

1000

=5.00, Q=3.58e-10 C σ =0.125, μ =5.00, Q=3.57e-10 C σ =0.062, μ =5.00, Q=3.49e-10 C σ =0.031, μ =5.00, Q=3.03e-10 C σ =0.016, μ Sensor gain = 1.00e+06 = 1.00e+00 GeV γE = 1.81e+03 γ/E_γn Light Collection = 8.00e-01 Sensor Coverage = 7.70e-01 PDE = 2.00e-01 Electronic gain = 1.00e+01 Overall Amplif = 2.23e+09