Time stamp (4 ns)

0 10 20 30

FADC (counts)

0 2 4 6 8 10 12 14 16 =0.060 GeV *atten, sum=105 γE FADC: 0-2000 V, 0-4095 0.3 mip equivalent) ≈( =9.0 pen Q: 4.57e+00 pC