momentum (GeV/c)

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 dp/p

0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

lines from momres markers from simulation mμ 150 mμ0

o =90 θ at ^+π dp/p vs. p for

momentum (GeV/c)

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

(radians) ϕΔ

0 0.001

0.002

0.003

0.004

0.005

0.006

0.007

0.008

0.009

0.01 mμ 150 mμ0 lines from momres markers from simulation

o =90 θ at ^+π vs. p for ϕΔ