MOMRES CDC 90 deg resolution vs measurement σ

0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0 100 200 300 Measurement σ (μm)

Δp/p

p=0.4 p=0.8 p=1.2

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0 100 200 300 Measurement σ (μm)

ΔΘ (radians)

p=0.4 p=0.8 p=1.2

0 200 400 600 800 1000

1200

1400

1600

1800

2000

0 100 200 300 Measurement σ (μm)

Δx (μm)

p=0.4 p=0.8 p=1.2

Comparisons for p = 0.8 Ratio σ=150μm/σ=100μm

Δp/p ratio=1.08477 ΔΘ ratio=1.07538 Δx ratio=1.12296