-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

0 50 100 150 200 250 300 350

ϕ (degree)

A=(σ^+-σ^-)/(σ^++σ^-)

Q^2 = 5.4 (GeV/c)^2 x_B = 0.35 -t = 0.3 (GeV/c)^2

2000 hours at L= 10^{35} cm^{-2} sec^{-1}

b_{val} = 1.0, b_{sea} = 1.0 ξ independent