Position (m) -3 10^{-2}10^{-1}10 1

Temperature (K)

1

10

210

310

=0.00011m2/s α =0.00035 m, σ =4.2 K, b t=0.0010 s, T =0.00011m2/s α =0.00035 m, σ =4.2 K, b t=0.0100 s, T =0.00011m2/s α =0.00035 m, σ =4.2 K, b t=0.1000 s, T =0.00011m2/s α =0.00035 m, σ =4.2 K, b t=1.0000 s, T =0.00011m2/s α =0.00035 m, σ =4.2 K, b t=10.0000 s, T =0.00011m2/s α =0.00035 m, σ =4.2 K, b Steady State T