Time (s)

1 10^210

Current (A)

0

5000

10000

15000

20000

25000

30000

=26 H 1L =1e-05 H 2L M=0.00548234 H =0.34 γ Ω =0.06

dump R =1177.21 s 1λ =359.061 s 2λ

Solenoid

=9.06667e-09 sR =9.06667e-08 sR =9.06667e-07 sR =9.06667e-06 sR

Time (s)

1 10^210

Current (A)

310

410

510

610 Solenoid =9.06667e-09 sR =9.06667e-08 sR =9.06667e-07 sR =9.06667e-06 sR

Time (s) -1 10 1 10^210^310

Power (W)

-1 10

1 10 210 310

410 510 Solenoid

=9.06667e-09 sR =9.06667e-08 sR =9.06667e-07 sR =9.06667e-06 sR