Time (s)

0 200 400

Current (A)

-3000

-2000

-1000

0

1000

2000

3000_{Solenoid current}

Single loop current

=26 H 1L =1.22873e-06 H 2L M=0.000565217 H =0.1 γ Ω =0.06

dump R Ω =9.06667e-06

short R =433.335 s 1λ =0.134166 s 2λ Time (s)

0 200 400

Current (A)

210

310

410

510 Solenoid current

Single loop current

Time (s)

0 500 1000

Power (W)

-1 10

1 10 210 310

410 510 Stored Energy=2.925e+07 J Energy Solenoid=2.90272e+07 J Energy Loop=90.4143 J