Time (s)

1 10^210

Current (A)

0

5000

10000

15000

20000_{Solenoid current}

Short current Current sum

=26 H 1L =1e-05 H 2L M=0.00548234 H =0.34 γ Ω =0.06

dump R Ω =9.06667e-06

short R Ω =4.89564e-05

loop R =433.144 s 1λ =0.152469 s 2λ

Time (s)

1 10^210

Current (A)

310

410

510_{Solenoid current}

Short current Current sum

Time (s) -1 10 1 10^210^310

Power (W)

-2 10

-1 10 1 10 210 310 410 510 Stored Energy=2.925e+07 J Energy Solenoid=2.89448e+07 J Energy Short=8495.73 J Energy Loop=0 J