10

10^2

0 50 100 150

Mean RMS 52.24 37.88

theta (deg)

10^2

0 20 40 60

Mean RMS 20.20 17.48

theta (deg)

1 10 10^2

10^3

0 0.02 0.04 0.06 0.08 0.1

Mean RMS 0.3001E-02 0.6667E-02

energy (GeV) 1 10 10^2

10^3

10^4

0 0.1 0.2 0.3 0.4 0.5

Mean RMS 0.1322E-01 0.3166E-01

energy (GeV)

10^{-3}

10^{-2}

10^{-1}

0 25 50 75 100

Gamma theta (deg) energy (GeV)

10^{-3}

10^{-2}

10^{-1}

0 20 40 60

Electron theta (deg)