1 10 10^2

10^3

0 2 4 6 8 10 12 14 16 18 20

Mean RMS 0.8869 2.217

theta (deg)

10 10^2

10^3

0 0.5 1 1.5 2 2.5 3 3.5 4

Mean RMS 0.6186 0.8701

energy (GeV)

10^{-2}

10^{-1} 1

0 2 4 6 8 10 12 14 16 18 20

electron positron theta (deg) energy (GeV)