Mean 0.3021 RMS 0.7153

HITS N 0 2 4 6 8 101214 1618 1 10 210 310 410 510 EM background

Mean 2.074 RMS 1.574

HITS N 0 2 4 6 8 10 12141618 1

10

210

310

410 Mean 2.074

< 8 GeV γ Hadronic E

Mean 3.798 RMS 1.943

HITS N 0 2 4 6 8 10 12141618 1

10

210

310 > 8 GeV γ Hadronic E