Beam Energy (GeV)

1.5 2 2.5 3 0

500

1000

1500

2000

2500

] Eb=1.50-2.55 GeV 2 < 0.45 GeV K [-t ] Eb=1.50-2.55 GeV 2 K [-t

0 0.5 1 1.5 2 0 500 1000

1500

2000

2500

3000

3500

4000

)^2

(GeV K ] -t 2 <0.45 GeV

K[-t )^2(GeV_K] -t^2

K[-t

0 0.5 1 1.5 2 0

500

1000

1500

2000

2500

)^2

(GeV ϕ ] -t 2 <0.45 GeV

K[-t )^2 (GeV_ϕ] -t^2

K[-t

0.9 0.95 1 1.05 1.1 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

] mKK (GeV) 2 <0.45 GeV

K[-t ] mKK (GeV) 2 K[-t