0

50

100

150

200

250

)^2

(GeV 2 pK m 2 2.1 2.2 2.3 2.4 2.5 2.6 2.7 2.8 2.9 3

)^2 (GeV 2 KK m

0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 Eb=1.50-2.55 GeV

0.9 0.95 1 1.05 1.1 0

1000

2000

3000

4000

5000

)^2

(GeV 2 ] mKK 2 <0.45 GeV

K[-t )^2 (GeV^2 2 K[-t

2 2.1 2.2 2.3 2.4 2.5 2.6 2.7 2.8 2.9 3 0

100

200

300

400

500

)^2

(GeV 2 ] mKp 2 <0.45 GeV

K[-t )^2(GeV^2 2 K[-t

1.4 1.5 1.6 1.7 1.8 1.9 0 100 200 300 400 500 600 700 800 900 ] mKp (GeV) 2 <0.45 GeV

K[-t ] mKp (GeV) 2 K[-t