(GeV) pK m 1.4 1.6 1.8 2

Counts

0 20 40 60 80 100 120 140 / ndf

2χ 56.69 / 46 Prob 0.1342 p0 0.6639 ± 6.13 p1 0.003409 ± 0.0336 p2 0.8273 ± 17.13 p3 0.003075 ± 1.485

± ± ± ±