(GeV) pK m 1.4 1.6 1.8 2

Counts

0 20 40 60 80 100 120 140 / ndf

2χ 42.11 / 46 Prob 0.6361 p0 0± 6.13 p1 0± 0.0336 p2 0.3731 ± 16.75 p3 0± 1.485 p4 0.1049 ± 0.3448 p5 0.001593 ± 1.544 p6 0.001312 ± 0.004595

±

± ± ± 20.0 ± Signal=65.8 15.9 ± Back=251.7 Naive Sig=4.1 ln(LB)=7393.9 ln(LB+S)=7401.0 Log Sig=3.8