(GeV) pK m 1.4 1.6 1.8 2

Counts

0 20 40 60 80 100 120 140 / ndf

2χ 46.62 / 46 Prob 0.4468 p0 0.7404 ± 5.062 p1 0.004819 ± 0.0377 p2 1.189± 16.81 p3 0.003841 ± 1.482

± ±

±