(GeV) pK m 1.4 1.6 1.8 2

Counts

0 20 40 60 80 100 120 140 / ndf

2χ 44.37 / 46 Prob 0.5408 p0 0± 5.062 p1 0± 0.0377 p2 0.4141 ± 18.35 p3 0± 1.482 p4 0.119± 0.46 p5 0.001491 ± 1.544 p6 0.001423 ± 0.00545

±

± ± 22.7 ± Signal=87.8 16.7 ± Back=278.5 Naive Sig=5.3 ln(LB)=7389.3 ln(LB+S)=7400.5 Log Sig=4.7